`net[n]`: `name=<string> [,bridge=<bridge>] [,firewall=<1|0>] [,gw=<GatewayIPv4>] [,gw6=<GatewayIPv6>] [,hwaddr=<XX:XX:XX:XX:XX:XX>] [,ip=<IPv4Format/CIDR>] [,ip6=<IPv6Format/CIDR>] [,mtu=<integer>] [,rate=<mbps>] [,tag=<integer>] [,trunks=<vlanid[;vlanid...]>] [,type=<veth>]`

`bridge`: `<bridge>` ::

Bridge to attach the network device to.

`firewall`: `boolean` ::

Controls whether this interface's firewall rules should be used.

`gw`: `<GatewayIPv4>` ::

Default gateway for IPv4 traffic.

`gw6`: `<GatewayIPv6>` ::

Default gateway for IPv6 traffic.

`hwaddr`: `<XX:XX:XX:XX:XX:XX>` ::

The interface MAC address. This is dynamically allocated by default, but you can set that statically if needed, for example to always have the same link-local IPv6 address. (lxc.network.hwaddr)

`ip`: `<IPv4Format/CIDR>` ::

IPv4 address in CIDR format.

`ip6`: `<IPv6Format/CIDR>` ::

IPv6 address in CIDR format.

`mtu`: `integer (64 - N)` ::

Maximum transfer unit of the interface. (lxc.network.mtu)

`name`: `<string>` ::

Name of the network device as seen from inside the container. (lxc.network.name)

`rate`: `<mbps>` ::

Apply rate limiting to the interface

`tag`: `integer (1 - 4094)` ::

VLAN tag for this interface.

`trunks`: `<vlanid[;vlanid...]>` ::

VLAN ids to pass through the interface

`type`: `(veth)` ::

Network interface type.

