`net[n]`: `name=<string> [,bridge=<bridge>] [,firewall=<1|0>] [,gw=<GatewayIPv4>] [,gw6=<GatewayIPv6>] [,hwaddr=<XX:XX:XX:XX:XX:XX>] [,ip=<(IPv4/CIDR|dhcp|manual)>] [,ip6=<(IPv6/CIDR|auto|dhcp|manual)>] [,link_down=<1|0>] [,mtu=<integer>] [,rate=<mbps>] [,tag=<integer>] [,trunks=<vlanid[;vlanid...]>] [,type=<veth>]` ::

Specifies network interfaces for the container.

`bridge`=`<bridge>` ;;

Bridge to attach the network device to.

`firewall`=`<boolean>` ;;

Controls whether this interface's firewall rules should be used.

`gw`=`<GatewayIPv4>` ;;

Default gateway for IPv4 traffic.

`gw6`=`<GatewayIPv6>` ;;

Default gateway for IPv6 traffic.

`hwaddr`=`<XX:XX:XX:XX:XX:XX>` ;;

A common MAC address with the I/G (Individual/Group) bit not set.

`ip`=`<(IPv4/CIDR|dhcp|manual)>` ;;

IPv4 address in CIDR format.

`ip6`=`<(IPv6/CIDR|auto|dhcp|manual)>` ;;

IPv6 address in CIDR format.

`link_down`=`<boolean>` ;;

Whether this interface should be disconnected (like pulling the plug).

`mtu`=`<integer> (64 - 65535)` ;;

Maximum transfer unit of the interface. (lxc.network.mtu)

`name`=`<string>` ;;

Name of the network device as seen from inside the container. (lxc.network.name)

`rate`=`<mbps>` ;;

Apply rate limiting to the interface

`tag`=`<integer> (1 - 4094)` ;;

VLAN tag for this interface.

`trunks`=`<vlanid[;vlanid...]>` ;;

VLAN ids to pass through the interface

`type`=`<veth>` ;;

Network interface type.

