`net[n]`: `name=<string> [,bridge=<bridge>] [,firewall=<1|0>] [,gw=<GatewayIPv4>] [,gw6=<GatewayIPv6>] [,hwaddr=<XX:XX:XX:XX:XX:XX>] [,ip=<IPv4Format/CIDR>] [,ip6=<IPv6Format/CIDR>] [,mtu=<integer>] [,rate=<mbps>] [,tag=<integer>] [,trunks=<vlanid[;vlanid...]>] [,type=<veth>]` ::

Specifies network interfaces for the container.

`bridge`=`<bridge>` ;;

Bridge to attach the network device to.

`firewall`=`<boolean>` ;;

Controls whether this interface's firewall rules should be used.

`gw`=`<GatewayIPv4>` ;;

Default gateway for IPv4 traffic.

`gw6`=`<GatewayIPv6>` ;;

Default gateway for IPv6 traffic.

`hwaddr`=`<XX:XX:XX:XX:XX:XX>` ;;

The interface MAC address. This is dynamically allocated by default, but you can set that statically if needed, for example to always have the same link-local IPv6 address. (lxc.network.hwaddr)

`ip`=`<IPv4Format/CIDR>` ;;

IPv4 address in CIDR format.

`ip6`=`<IPv6Format/CIDR>` ;;

IPv6 address in CIDR format.

`mtu`=`<integer> (64 - N)` ;;

Maximum transfer unit of the interface. (lxc.network.mtu)

`name`=`<string>` ;;

Name of the network device as seen from inside the container. (lxc.network.name)

`rate`=`<mbps>` ;;

Apply rate limiting to the interface

`tag`=`<integer> (1 - 4094)` ;;

VLAN tag for this interface.

`trunks`=`<vlanid[;vlanid...]>` ;;

VLAN ids to pass through the interface

`type`=`<veth>` ;;

Network interface type.

