[[chapter_deployment]]
Planning for Deployment
=======================

Easy Integration into Existing Email Server Architecture
--------------------------------------------------------

In this sample configuration, your email traffic (SMTP) arrives on
the firewall and will be directly forwarded to your email server.

image::images/2018_IT_infrastructure_without_Proxmox_Mail_Gateway_final_1024.png[]

By using {pmg}, all your email traffic is forwarded to
the {pmg} instance, which filters the email traffic and
removes unwanted emails. This allows you to manage incoming and outgoing mail
traffic.

image::images/2018_IT_infrastructure_with_Proxmox_Mail_Gateway_final_1024.png[]


Filtering Outgoing Emails
-------------------------

Many email filtering solutions do not scan outgoing mails. In contrast, {pmg} is
designed to scan both incoming and outgoing emails. This has two major
advantages:

. {pmg} is able to detect viruses sent from an internal host. In many
countries, you are liable for sending viruses to other
people. The outgoing email scanning feature is an additional
protection to avoid that.

. {pmg} can gather statistics about outgoing emails too. Statistics
about incoming emails may look nice, but they aren't necessarily helpful.
Consider two users; user-1 receives 10 emails from news
portals and writes 1 email to an unknown individual, while
user-2 receives 5 emails from customers and sends 5 emails
in return. With this information, user-2 can be considered as the more active
user, because they communicate more with your customers. {pmg} advanced address
statistics can show you this important information, whereas a solution which
does not scan outgoing email cannot do this.

To enable outgoing email filtering, you simply need to send all outgoing
emails through your {pmg} (usually by specifying {pmg} as
"smarthost" on your email server).

[[firewall_settings]]
Firewall Settings
-----------------

In order to pass email traffic to {pmg}, you need to allow traffic on the
SMTP port. Our software uses the Network Time Protocol (NTP), RAZOR, DNS, SSH,
and HTTP, as well as port 8006 for the web-based management interface.

[options="header"]
|======
|Service |Port    |Protocol |From       |To
|SMTP    |25      |TCP      |Proxmox    |Internet
|SMTP    |25      |TCP      |Internet   |Proxmox
|SMTP    |26      |TCP      |Mailserver |Proxmox
|NTP     |123     |TCP/UDP  |Proxmox    |Internet
|RAZOR   |2703    |TCP      |Proxmox    |Internet
|DNS     |53      |TCP/UDP  |Proxmox    |DNS Server
|HTTP    |80      |TCP      |Proxmox    |Internet
|GUI/API |8006    |TCP      |Intranet   |Proxmox
|======

CAUTION: It is recommended to restrict access to the GUI/API port as far
as possible.

The outgoing HTTP connection is mainly used by virus pattern updates,
and can be configured to use a proxy instead of a direct internet
connection.

You can use the 'nmap' utility to test your firewall settings (see
section xref:nmap[port scans]).


[[system_requirements]]
System Requirements
-------------------

{pmg} can run on dedicated server hardware or inside a virtual machine on
any of the following platforms:

* Proxmox VE (KVM)

* VMWare vSphere&trade; (open-vm tools are integrated in the ISO)

* Hyper-V&trade; (Hyper-V Linux integration tools are integrated in the ISO)

* KVM (virtio drivers are integrated, great performance)

* VirtualBox&trade;

* Citrix Hypervisor&trade; (former XenServer&trade;)

* LXC container

* and others that support Debian Linux as a guest OS

Please see https://www.proxmox.com for details.

To benchmark your hardware, run 'pmgperf' after installation.


Minimum System Requirements
~~~~~~~~~~~~~~~~~~~~~~~~~~~

* CPU: 64bit (Intel EMT64 or AMD64)

* 2 GB RAM

* Bootable CD-ROM-drive or USB boot support

* Monitor with a minimum resolution of 1024x768 for the installation

* Hard disk with at least 8 GB of disk space

* Ethernet network interface card (NIC)


Recommended System Requirements
~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

* Multi-core CPU: 64bit (Intel EMT64 or AMD64), +
** for use in a virtual machine, activate Intel VT/AMD-V CPU flag

* 4 GB RAM

* Bootable CD-ROM-drive or USB boot support

* Monitor with a minimum resolution of 1024x768 for the installation

* 1 Gbps Ethernet network interface card (NIC)

* Storage: at least 8 GB free disk space, best set up with redundancy,
  using a hardware RAID controller with battery backed write cache (``BBU'') or
  ZFS. ZFS is not compatible with hardware RAID controllers. For best
  performance, use enterprise-class SSDs with power loss protection.


Supported web browsers for accessing the web interface
~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

To use the web interface, you need a modern browser. This includes:

* Firefox, a release from the current year, or the latest Extended
Support Release
* Chrome, a release from the current year
* Microsoft's currently supported version of Edge
* Safari, a release from the current year
